INSERT INTO `config_options` (`id`, `option_name`, `description`, `uniq`, `type`, `default_value`, `min_value`, `max_value`) VALUES
(63, 'wiki_web', 'Web for Wiki. Default - Main. http://example.local/Main/WebHome', 1, 'text', 'Main', 0, 0);
