ALTER TABLE worklog ROW_FORMAT=COMPRESSED KEY_BLOCK_SIZE=8;
ALTER TABLE dhcp_log ROW_FORMAT=COMPRESSED KEY_BLOCK_SIZE=8;
ALTER TABLE remote_syslog ROW_FORMAT=COMPRESSED KEY_BLOCK_SIZE=8;
